%GNUPLOT: LaTeX picture with Postscript
\begin{picture}(0,0)%
\includegraphics{Ua2T.Werte}%
\end{picture}%
\setlength{\unitlength}{0.0200bp}%
\begin{picture}(18000,10800)(0,0)%
\put(1925,1650){\makebox(0,0)[r]{\strut{}-40}}%
\put(1925,3083){\makebox(0,0)[r]{\strut{}-20}}%
\put(1925,4517){\makebox(0,0)[r]{\strut{} 0}}%
\put(1925,5950){\makebox(0,0)[r]{\strut{} 20}}%
\put(1925,7383){\makebox(0,0)[r]{\strut{} 40}}%
\put(1925,8817){\makebox(0,0)[r]{\strut{} 60}}%
\put(1925,10250){\makebox(0,0)[r]{\strut{} 80}}%
\put(2200,1100){\makebox(0,0){\strut{} 0}}%
\put(5195,1100){\makebox(0,0){\strut{} 1}}%
\put(8190,1100){\makebox(0,0){\strut{} 2}}%
\put(11185,1100){\makebox(0,0){\strut{} 3}}%
\put(14180,1100){\makebox(0,0){\strut{} 4}}%
\put(17175,1100){\makebox(0,0){\strut{} 5}}%
\put(550,5950){\rotatebox{90}{\makebox(0,0){\strut{}Temperatur Errechnet grad C}}}%
\put(9687,275){\makebox(0,0){\strut{}Ausgangsspannung in V}}%
\put(14950,2775){\makebox(0,0)[r]{\strut{}Errechnet}}%
\put(14950,2225){\makebox(0,0)[r]{\strut{}Lineare Naeherung}}%
\end{picture}%
\endinput
