\section{test001interface.c File Reference}
\label{test001interface_8c}\index{test001interface.c@{test001interface.c}}
Testprogram for the interface to the robot. 


{\tt \#include $<$stdio.h$>$}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
{\bf main} (int argc, char $\ast$$\ast$argv[$\,$])
\end{CompactItemize}


\subsection{Detailed Description}
Testprogram for the interface to the robot.

Interface will be initiated, than absolutes coordinates are asked for.



\subsection{Function Documentation}
\index{test001interface.c@{test001interface.c}!main@{main}}
\index{main@{main}!test001interface.c@{test001interface.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}main (int {\em argc}, char $\ast$$\ast$ {\em argv}[$\,$])}\label{test001interface_8c_a0}


