\section{tes005realtime.c File Reference}
\label{tes005realtime_8c}\index{tes005realtime.c@{tes005realtime.c}}
{\tt \#include $<$stdio.h$>$}\par
{\tt \#include \char`\"{}libcomm.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
{\bf linemonitor\_\-exception} (char $\ast$server, int port, int type)
\begin{CompactList}\small\item\em Exception Function, print exception code and meaning on the screen.\item\end{CompactList}\item 
{\bf main} (int argc, char $\ast$argv[$\,$])
\begin{CompactList}\small\item\em test0001sockts: see test0001sockts.c.\item\end{CompactList}\end{CompactItemize}


\subsection{Function Documentation}
\index{tes005realtime.c@{tes005realtime.c}!linemonitor_exception@{linemonitor\_\-exception}}
\index{linemonitor_exception@{linemonitor\_\-exception}!tes005realtime.c@{tes005realtime.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}linemonitor\_\-exception (char $\ast$ {\em server}, int {\em port}, int {\em type})}\label{tes005realtime_8c_a0}


Exception Function, print exception code and meaning on the screen.

\index{tes005realtime.c@{tes005realtime.c}!main@{main}}
\index{main@{main}!tes005realtime.c@{tes005realtime.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}main (int {\em argc}, char $\ast$ {\em argv}[$\,$])}\label{tes005realtime_8c_a1}


test0001sockts: see test0001sockts.c.

